LIBRARY K8055D
EXPORTS
    Version@0
    OpenDevice@4
    CloseDevice@0
    ReadAnalogChannel@4
    SetAllAnalog@0
    ClearAllAnalog@0
    SetAllDigital@0
    ClearAllDigital@0
    ClearDigitalChannel@4
    SetDigitalChannel@4
    ReadDigitalChannel@4
    ReadAllDigital@0
    OutputAnalogChannel@8
    ClearAnalogChannel@4
    SetAnalogChannel@4
    WriteAllDigital@4
    OutputAllAnalog@8
    ReadCounter@4
    ResetCounter@4
    SetCurrentDevice
    SearchDevices
    ReadAllAnalog@8
    SetCounterDebounceTime@8