DEFINITION MODULE MiscLib;

	(********************************************************)
	(*							*)
	(*	   Miscellaneous library procedures		*)
	(*	for which the implementation has to be in	*)
	(*		assembly language			*)
	(*							*)
	(*  Programmer:		P. Moylan			*)
	(*  Last edited:	22 August 1994			*)
	(*  Status:		OK				*)
	(*							*)
	(*	This version is for TopSpeed version 1.17	*)
	(*							*)
	(********************************************************)

PROCEDURE InStringWord (port: CARDINAL;  BufferAddress: ADDRESS;
						count: CARDINAL);

    (* Reads count words from an input port.	*)

PROCEDURE OutStringWord (port: CARDINAL;  BufferAddress: ADDRESS;
						count: CARDINAL);

    (* Writes count words to an output port.	*)

END MiscLib.
